-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.124283861396
cusum  =  0.120926341549
eta  =  0.511521626779
hl_amp_ratio  =  1.12356661916
kurtosis  =  -1.30002419458
n_points  =  324
period  =  0.647565789692
period_SNR  =  23.5050153373
period_log10FAP  =  -24.2827662249
period_uncertainty  =  0.000156578956389
phase_cusum  =  0.24880587839
phase_eta  =  0.872990658907
phi21  =  -0.19637076122
phi31  =  0.809308344276
quartile31  =  0.27
r21  =  0.2978074283
r31  =  0.412824799261
shapiro_w  =  0.914326786995
skewness  =  0.157024731049
slope_per10  =  -0.192739893784
slope_per90  =  0.178563232152
stetson_k  =  0.915167917146
weighted_mean  =  15.4799234099
weighted_std  =  0.135981383008
