-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.187033574394
cusum  =  0.144873354626
eta  =  0.581744497005
hl_amp_ratio  =  0.868837245061
kurtosis  =  -1.1908693457
n_points  =  266
period  =  0.695113313454
period_SNR  =  43.8185054135
period_log10FAP  =  -38.6069083056
period_uncertainty  =  0.000138193506924
phase_cusum  =  0.318732396048
phase_eta  =  0.153183365076
phi21  =  1.07335925484
phi31  =  5.32677395618
quartile31  =  0.31
r21  =  0.437353521361
r31  =  0.253079279686
shapiro_w  =  0.950110018253
skewness  =  -0.155392024387
slope_per10  =  -0.209789780835
slope_per90  =  0.36323186841
stetson_k  =  0.872890505758
weighted_mean  =  13.5350110319
weighted_std  =  0.173183194035
