-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.71


######### Lightcurve features #########

amplitude  =  0.196166092374
cusum  =  0.182485550312
eta  =  1.2986781948
hl_amp_ratio  =  1.15149598306
kurtosis  =  -0.128226288873
n_points  =  416
period  =  0.633210695601
period_SNR  =  42.7998532683
period_log10FAP  =  -30.2270537556
period_uncertainty  =  0.00010456613914
phase_cusum  =  0.246174704906
phase_eta  =  1.29420471719
phi21  =  -1.89675346148
phi31  =  -3.81530019793
quartile31  =  0.29
r21  =  0.273828737552
r31  =  0.0517606866618
shapiro_w  =  0.995336353779
skewness  =  0.140297042349
slope_per10  =  -0.0518039438812
slope_per90  =  0.0446523184383
stetson_k  =  0.816706012699
weighted_mean  =  18.6534957533
weighted_std  =  0.195836353777
