-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.270885688696
cusum  =  0.216015857975
eta  =  0.67921014094
hl_amp_ratio  =  0.830747773002
kurtosis  =  -0.322290181748
n_points  =  253
period  =  0.523427301665
period_SNR  =  31.954072694
period_log10FAP  =  -25.4478835719
period_uncertainty  =  0.000112585769349
phase_cusum  =  0.257226200499
phase_eta  =  0.428476356813
phi21  =  -2.5261921775
phi31  =  -4.37679105929
quartile31  =  0.35
r21  =  0.348399649132
r31  =  0.260418510615
shapiro_w  =  0.960342466831
skewness  =  -0.529187727198
slope_per10  =  -0.112145035621
slope_per90  =  0.20394809119
stetson_k  =  0.822210969522
weighted_mean  =  14.3245475735
weighted_std  =  0.232757184535
