<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.332015376665
cusum  =  0.132503459054
eta  =  0.467233323873
hl_amp_ratio  =  0.309705828884
kurtosis  =  -0.426850379618
n_points  =  382
period  =  0.563840425649
period_SNR  =  46.5013836119
period_log10FAP  =  -50.0675790854
period_uncertainty  =  8.63250104626e-05
phase_cusum  =  0.242428231108
phase_eta  =  0.179977504824
phi21  =  -2.26675436628
phi31  =  -1.71434724843
quartile31  =  0.4425
r21  =  0.433014975103
r31  =  0.324964319027
shapiro_w  =  0.862314343452
skewness  =  -0.756276142775
slope_per10  =  -0.123462396398
slope_per90  =  0.247547854951
stetson_k  =  0.72210891621
weighted_mean  =  13.9423227714
weighted_std  =  0.303294066276
</pre></body></html>