-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.285144048709
cusum  =  0.11389820253
eta  =  1.37578100502
hl_amp_ratio  =  0.822306842461
kurtosis  =  0.128925378783
n_points  =  406
period  =  0.634383778293
period_SNR  =  40.1440973082
period_log10FAP  =  -27.5899104562
period_uncertainty  =  0.000104953973093
phase_cusum  =  0.218439602877
phase_eta  =  1.01773521419
phi21  =  4.00920902826
phi31  =  5.24996526674
quartile31  =  0.425
r21  =  0.444840378682
r31  =  0.233013261778
shapiro_w  =  0.994580149651
skewness  =  0.0941253355645
slope_per10  =  -0.0385817009813
slope_per90  =  0.0329021933363
stetson_k  =  0.79452924436
weighted_mean  =  19.0463303135
weighted_std  =  0.302147713055
