-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.371259684859
cusum  =  0.221864198332
eta  =  0.895510073251
hl_amp_ratio  =  0.859369831301
kurtosis  =  -0.629934693454
n_points  =  358
period  =  0.613646145628
period_SNR  =  38.2739567309
period_log10FAP  =  -34.6299173228
period_uncertainty  =  0.000104389997733
phase_cusum  =  0.202294717237
phase_eta  =  0.624347631858
phi21  =  -2.25350966231
phi31  =  -0.944418927345
quartile31  =  0.55
r21  =  0.426080651726
r31  =  0.235169879178
shapiro_w  =  0.985492885113
skewness  =  0.0845504232607
slope_per10  =  -0.0402601219308
slope_per90  =  0.0468153860279
stetson_k  =  0.791659936015
weighted_mean  =  18.3992853375
weighted_std  =  0.347578651587
