-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.73


######### Lightcurve features #########

amplitude  =  0.300763887916
cusum  =  0.17925126081
eta  =  0.412867762731
hl_amp_ratio  =  0.389638728772
kurtosis  =  -0.908999800388
n_points  =  179
period  =  0.604189960953
period_SNR  =  21.6713197166
period_log10FAP  =  -22.1389834978
period_uncertainty  =  0.000117944426358
phase_cusum  =  0.246408998753
phase_eta  =  0.156455152193
phi21  =  4.11620229745
phi31  =  5.09953876548
quartile31  =  0.46
r21  =  0.417421183829
r31  =  0.203802493983
shapiro_w  =  0.87253588438
skewness  =  -0.689381992671
slope_per10  =  -0.151621945803
slope_per90  =  0.531999999657
stetson_k  =  0.775381602223
weighted_mean  =  14.9527608803
weighted_std  =  0.259267444098
