-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.168835286651
cusum  =  0.143857477612
eta  =  0.692135276194
hl_amp_ratio  =  0.61175315153
kurtosis  =  -0.474967389719
n_points  =  230
period  =  0.61259922549
period_SNR  =  30.6831553653
period_log10FAP  =  -29.0180053194
period_uncertainty  =  0.000160135737744
phase_cusum  =  0.208172367011
phase_eta  =  0.2347678976
phi21  =  -2.09917884197
phi31  =  -0.800879938322
quartile31  =  0.19
r21  =  0.42274095263
r31  =  0.245730644364
shapiro_w  =  0.960131645203
skewness  =  -0.545726990395
slope_per10  =  -0.249578432891
slope_per90  =  0.352516865622
stetson_k  =  0.793584139918
weighted_mean  =  15.5533587354
weighted_std  =  0.12806289752
