<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.31


######### Lightcurve features #########

amplitude  =  0.403114656105
cusum  =  0.351006630032
eta  =  0.62734515744
hl_amp_ratio  =  1.28815026242
kurtosis  =  -0.996795796271
n_points  =  40
period  =  0.956123495546
period_SNR  =  9.59047044789
period_log10FAP  =  -1.9236509719
period_uncertainty  =  0.00051940665274
phase_cusum  =  0.446207395765
phase_eta  =  0.388230906788
phi21  =  -0.62626566559
phi31  =  -0.933235744977
quartile31  =  0.495
r21  =  0.102392792312
r31  =  0.0809114683378
shapiro_w  =  0.953394114971
skewness  =  0.247414213975
slope_per10  =  -0.469264108039
slope_per90  =  0.325454630632
stetson_k  =  0.843801769269
weighted_mean  =  17.1321405412
weighted_std  =  0.303872753515
</pre></body></html>