-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.223698903148
cusum  =  0.14863291016
eta  =  0.698420123575
hl_amp_ratio  =  0.760638653276
kurtosis  =  -0.623039350731
n_points  =  418
period  =  0.607937041731
period_SNR  =  52.9264557299
period_log10FAP  =  -51.7704872875
period_uncertainty  =  0.000102470512795
phase_cusum  =  0.241705606616
phase_eta  =  0.3312564561
phi21  =  1.00170845699
phi31  =  2.25393971006
quartile31  =  0.26
r21  =  0.444635381177
r31  =  0.211476453398
shapiro_w  =  0.981981158257
skewness  =  -0.263821553468
slope_per10  =  -0.101922737836
slope_per90  =  0.0918231662792
stetson_k  =  0.804082067075
weighted_mean  =  17.8016366028
weighted_std  =  0.178409572419
