<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.280816784768
cusum  =  0.176667510213
eta  =  0.445344750581
hl_amp_ratio  =  0.65821192328
kurtosis  =  -0.766499514709
n_points  =  172
period  =  0.542891141454
period_SNR  =  17.1092582205
period_log10FAP  =  -15.737081815
period_uncertainty  =  6.3492327803e-05
phase_cusum  =  0.251487450908
phase_eta  =  0.346984541088
phi21  =  0.758608127032
phi31  =  1.93983777426
quartile31  =  0.38
r21  =  0.480828468203
r31  =  0.320071390865
shapiro_w  =  0.958083570004
skewness  =  -0.433333441238
slope_per10  =  -0.233921404475
slope_per90  =  0.192999995003
stetson_k  =  0.803750422895
weighted_mean  =  16.0491467873
weighted_std  =  0.259850786209
</pre></body></html>