-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.200882563873
cusum  =  0.0922939616758
eta  =  0.873382759495
hl_amp_ratio  =  0.878034174321
kurtosis  =  -0.668934923707
n_points  =  332
period  =  0.606152215885
period_SNR  =  35.766802368
period_log10FAP  =  -32.3071674201
period_uncertainty  =  0.000105403114954
phase_cusum  =  0.226032602693
phase_eta  =  0.606143127909
phi21  =  -2.25951762878
phi31  =  -4.12194141619
quartile31  =  0.2925
r21  =  0.423383530913
r31  =  0.267428541201
shapiro_w  =  0.982963204384
skewness  =  -0.17594475435
slope_per10  =  -0.0652615083097
slope_per90  =  0.104103127311
stetson_k  =  0.8133857305
weighted_mean  =  17.9716110323
weighted_std  =  0.19856895835
