-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.266561835307
cusum  =  0.141794695206
eta  =  0.680060068269
hl_amp_ratio  =  0.63558447536
kurtosis  =  -0.644255531648
n_points  =  253
period  =  0.617271721139
period_SNR  =  38.2318177284
period_log10FAP  =  -29.8738317023
period_uncertainty  =  0.00013419923552
phase_cusum  =  0.260053679339
phase_eta  =  0.411163036375
phi21  =  3.88209777949
phi31  =  5.21046176189
quartile31  =  0.38
r21  =  0.371848321482
r31  =  0.230113711313
shapiro_w  =  0.948798656464
skewness  =  -0.515156530904
slope_per10  =  -0.157565744831
slope_per90  =  0.111668349925
stetson_k  =  0.78679985445
weighted_mean  =  15.3023797595
weighted_std  =  0.227321227328
