-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.308564821494
cusum  =  0.179933201091
eta  =  0.54374296013
hl_amp_ratio  =  0.51541900367
kurtosis  =  -1.23413277822
n_points  =  247
period  =  0.633981634045
period_SNR  =  31.462101442
period_log10FAP  =  -32.9899310754
period_uncertainty  =  0.000108099449553
phase_cusum  =  0.271554582403
phase_eta  =  0.101627511473
phi21  =  -2.17529707345
phi31  =  -4.21107243421
quartile31  =  0.47
r21  =  0.394133659646
r31  =  0.358356317584
shapiro_w  =  0.921189188957
skewness  =  -0.295411910463
slope_per10  =  -0.131461919902
slope_per90  =  0.359350000508
stetson_k  =  0.858414591377
weighted_mean  =  13.7962115272
weighted_std  =  0.260021163074
