<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.295529144975
cusum  =  0.217797623907
eta  =  1.0953128613
hl_amp_ratio  =  0.870240913933
kurtosis  =  -0.364736614797
n_points  =  330
period  =  0.561455086234
period_SNR  =  30.2200533514
period_log10FAP  =  -19.3578168327
period_uncertainty  =  8.73887279436e-05
phase_cusum  =  0.260714120651
phase_eta  =  1.03863310956
phi21  =  -2.4752765123
phi31  =  -4.38843709506
quartile31  =  0.4475
r21  =  0.407957495001
r31  =  0.23910529673
shapiro_w  =  0.994949996471
skewness  =  -0.127419514815
slope_per10  =  -0.0321620556803
slope_per90  =  0.0405068625099
stetson_k  =  0.770064939041
weighted_mean  =  18.9190405984
weighted_std  =  0.327272664536
</pre></body></html>