-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.28


######### Lightcurve features #########

amplitude  =  0.173013256466
cusum  =  0.332678262409
eta  =  0.370047778386
hl_amp_ratio  =  1.26990151226
kurtosis  =  0.562798751636
n_points  =  332
period  =  4508.801265
period_SNR  =  29.54752725
period_log10FAP  =  -26.341190266
period_uncertainty  =  3381.60094875
phase_cusum  =  0.324132788173
phase_eta  =  0.511965839106
phi21  =  1.10625784834
phi31  =  2.78394258011
quartile31  =  0.19
r21  =  0.186373211678
r31  =  0.177683498279
shapiro_w  =  0.960708200932
skewness  =  0.650278997146
slope_per10  =  -77.1852045405
slope_per90  =  94.4811206294
stetson_k  =  0.752337540851
weighted_mean  =  16.9153543536
weighted_std  =  0.150564152055
