-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.181405111434
cusum  =  0.117803322622
eta  =  1.74664027331
hl_amp_ratio  =  0.924355078437
kurtosis  =  0.337900618284
n_points  =  412
period  =  0.611897274886
period_SNR  =  36.5037831427
period_log10FAP  =  -18.8991513404
period_uncertainty  =  0.000103809936854
phase_cusum  =  0.251891493168
phase_eta  =  1.64223562478
phi21  =  1.12759921573
phi31  =  -0.254602234269
quartile31  =  0.3025
r21  =  0.372152406765
r31  =  0.247340009063
shapiro_w  =  0.994758605957
skewness  =  0.191582208421
slope_per10  =  -0.0385772986412
slope_per90  =  0.0450381432001
stetson_k  =  0.79458726598
weighted_mean  =  19.0381499696
weighted_std  =  0.215301710378
