-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.215832875847
cusum  =  0.12894222748
eta  =  0.625354356726
hl_amp_ratio  =  0.477135036223
kurtosis  =  -0.543125792557
n_points  =  354
period  =  0.569474011123
period_SNR  =  48.0765359338
period_log10FAP  =  -49.6491955961
period_uncertainty  =  0.00010675636402
phase_cusum  =  0.262185038615
phase_eta  =  0.262371656184
phi21  =  4.10516110288
phi31  =  5.126533466
quartile31  =  0.29
r21  =  0.413476517886
r31  =  0.26080950287
shapiro_w  =  0.940423488617
skewness  =  -0.592780567233
slope_per10  =  -0.100749046499
slope_per90  =  0.229016663507
stetson_k  =  0.794049280449
weighted_mean  =  13.331820331
weighted_std  =  0.18983567826
