-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.273384744677
cusum  =  0.145052240357
eta  =  0.668753259544
hl_amp_ratio  =  0.465370621799
kurtosis  =  0.156841036706
n_points  =  346
period  =  1.0674245419
period_SNR  =  37.2878782331
period_log10FAP  =  -36.4497393436
period_uncertainty  =  0.00031584348196
phase_cusum  =  0.291752223829
phase_eta  =  0.500603460372
phi21  =  0.861842265631
phi31  =  1.88504154602
quartile31  =  0.3275
r21  =  0.418511418914
r31  =  0.236323604531
shapiro_w  =  0.932701587677
skewness  =  -0.874724108316
slope_per10  =  -0.121692814267
slope_per90  =  0.160427340174
stetson_k  =  0.71229743657
weighted_mean  =  17.1874668803
weighted_std  =  0.248900214197
