-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.26387671936
cusum  =  0.124098068082
eta  =  0.736205042023
hl_amp_ratio  =  0.457707685151
kurtosis  =  -0.529112937688
n_points  =  252
period  =  0.680728832815
period_SNR  =  38.7832222041
period_log10FAP  =  -30.6514337051
period_uncertainty  =  0.000135668219622
phase_cusum  =  0.242949396107
phase_eta  =  0.208319230964
phi21  =  -2.03043814281
phi31  =  -4.02275563038
quartile31  =  0.31
r21  =  0.441211182758
r31  =  0.327260242273
shapiro_w  =  0.930604457855
skewness  =  -0.676407515949
slope_per10  =  -0.286707359233
slope_per90  =  0.423694073655
stetson_k  =  0.766727105471
weighted_mean  =  13.8648182464
weighted_std  =  0.215345806549
