-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.26


######### Lightcurve features #########

amplitude  =  0.252199493135
cusum  =  0.105251689997
eta  =  1.234061938
hl_amp_ratio  =  0.898961686587
kurtosis  =  -0.117209691408
n_points  =  390
period  =  1.40002020494
period_SNR  =  35.4167820347
period_log10FAP  =  -24.7521670982
period_uncertainty  =  0.000543317450863
phase_cusum  =  0.217908854291
phase_eta  =  1.07148015818
phi21  =  1.30181352259
phi31  =  2.44404129315
quartile31  =  0.3975
r21  =  0.451426156929
r31  =  0.175894689878
shapiro_w  =  0.996077239513
skewness  =  0.110331322345
slope_per10  =  -0.064339380639
slope_per90  =  0.0992954819097
stetson_k  =  0.799620749921
weighted_mean  =  19.0307491214
weighted_std  =  0.290222187321
