<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  0.123184194572
cusum  =  0.124432184536
eta  =  0.498241724834
hl_amp_ratio  =  0.811637284458
kurtosis  =  -0.451956312373
n_points  =  248
period  =  0.342124481456
period_SNR  =  12.7711585658
period_log10FAP  =  -10.0163089371
period_uncertainty  =  3.13783553653e-05
phase_cusum  =  0.213406149659
phase_eta  =  0.935031647698
phi21  =  0.18143232935
phi31  =  -1.0102450137
quartile31  =  0.2325
r21  =  0.159028802794
r31  =  0.26006944694
shapiro_w  =  0.986288249493
skewness  =  -0.254789372638
slope_per10  =  -0.0621216396177
slope_per90  =  0.116579396515
stetson_k  =  0.808932812829
weighted_mean  =  15.4604763556
weighted_std  =  0.16056065684
</pre></body></html>