<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.20534387355
cusum  =  0.0989273860813
eta  =  0.534945895608
hl_amp_ratio  =  1.22664640582
kurtosis  =  -1.43619989006
n_points  =  332
period  =  0.331504481172
period_SNR  =  55.2655425259
period_log10FAP  =  -62.9733483724
period_uncertainty  =  3.1522620293e-05
phase_cusum  =  0.255772708562
phase_eta  =  0.0663367619128
phi21  =  1.87058924583
phi31  =  3.23648788599
quartile31  =  0.2725
r21  =  0.132930271735
r31  =  0.0560002996664
shapiro_w  =  0.920415997505
skewness  =  0.0988158445697
slope_per10  =  -0.17559598153
slope_per90  =  0.151352009928
stetson_k  =  0.900118555886
weighted_mean  =  15.0424838571
weighted_std  =  0.144535070593
</pre></body></html>