-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.344108653749
cusum  =  0.151867905924
eta  =  0.781345811597
hl_amp_ratio  =  0.304922180573
kurtosis  =  0.744325314292
n_points  =  325
period  =  0.623674605431
period_SNR  =  43.817722051
period_log10FAP  =  -31.2516660667
period_uncertainty  =  0.000132302637568
phase_cusum  =  0.175164801725
phase_eta  =  0.611982453243
phi21  =  0.599699313427
phi31  =  1.21496353838
quartile31  =  0.41
r21  =  0.411594807765
r31  =  0.265273594422
shapiro_w  =  0.870963096619
skewness  =  -1.02511873683
slope_per10  =  -0.0852363115531
slope_per90  =  0.19488529138
stetson_k  =  0.676134041577
weighted_mean  =  12.9819244436
weighted_std  =  0.319707440405
