-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.352882638126
cusum  =  0.147879598946
eta  =  0.500966438689
hl_amp_ratio  =  0.41887307167
kurtosis  =  -1.02270546325
n_points  =  363
period  =  0.608874802204
period_SNR  =  47.9122863413
period_log10FAP  =  -51.9863620332
period_uncertainty  =  0.000119833659868
phase_cusum  =  0.232499113929
phase_eta  =  0.122113621639
phi21  =  0.810316065237
phi31  =  -1.34755724975
quartile31  =  0.53
r21  =  0.418771384631
r31  =  0.275929011399
shapiro_w  =  0.891266226768
skewness  =  -0.567029081849
slope_per10  =  -0.124471917928
slope_per90  =  0.240684167032
stetson_k  =  0.794552288201
weighted_mean  =  14.3077447188
weighted_std  =  0.313727948581
