-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.362495220908
cusum  =  0.1823134523
eta  =  0.461233530508
hl_amp_ratio  =  0.376580985282
kurtosis  =  -0.846052698977
n_points  =  349
period  =  0.610907291511
period_SNR  =  39.6536449547
period_log10FAP  =  -45.3651697203
period_uncertainty  =  0.000103459441189
phase_cusum  =  0.252922689906
phase_eta  =  0.0243235028151
phi21  =  0.980559166967
phi31  =  2.11825194373
quartile31  =  0.5
r21  =  0.509205971934
r31  =  0.35651956458
shapiro_w  =  0.916273474693
skewness  =  -0.601246466745
slope_per10  =  -0.145408073578
slope_per90  =  0.27697224886
stetson_k  =  0.765539518287
weighted_mean  =  15.0574366868
weighted_std  =  0.317354391978
