-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.188818555738
cusum  =  0.154426364415
eta  =  1.56969062513
hl_amp_ratio  =  1.08952660072
kurtosis  =  0.223360993206
n_points  =  399
period  =  0.617428073263
period_SNR  =  29.8352578724
period_log10FAP  =  -15.6889730508
period_uncertainty  =  0.000105680557755
phase_cusum  =  0.186083201786
phase_eta  =  1.43788769878
phi21  =  -1.93212504967
phi31  =  -3.54313761798
quartile31  =  0.355
r21  =  0.422386573491
r31  =  0.200685029
shapiro_w  =  0.995964407921
skewness  =  0.0472684717057
slope_per10  =  -0.0387960672987
slope_per90  =  0.0384386102341
stetson_k  =  0.806549922648
weighted_mean  =  18.7963594852
weighted_std  =  0.251376458064
