-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.222516927585
cusum  =  0.0885596196588
eta  =  0.649977612588
hl_amp_ratio  =  1.17130085879
kurtosis  =  -1.01378630837
n_points  =  250
period  =  0.616267177914
period_SNR  =  37.0763213306
period_log10FAP  =  -28.9600110261
period_uncertainty  =  0.000133439308583
phase_cusum  =  0.340788029857
phase_eta  =  0.532587906386
phi21  =  -2.22373572527
phi31  =  -4.11947984155
quartile31  =  0.36
r21  =  0.385987475085
r31  =  0.223498567115
shapiro_w  =  0.952105402946
skewness  =  -0.0218096371229
slope_per10  =  -0.183948455196
slope_per90  =  0.18411583001
stetson_k  =  0.874012974359
weighted_mean  =  14.8301433189
weighted_std  =  0.196095882278
