-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.190167148178
cusum  =  0.135177464513
eta  =  0.571691832634
hl_amp_ratio  =  0.661747088398
kurtosis  =  -1.09612878335
n_points  =  358
period  =  0.624667423838
period_SNR  =  33.4472905934
period_log10FAP  =  -51.4299999901
period_uncertainty  =  0.000104340789832
phase_cusum  =  0.253023006238
phase_eta  =  0.078506246736
phi21  =  1.10364475989
phi31  =  2.43858316997
quartile31  =  0.2975
r21  =  0.461879126177
r31  =  0.259012473319
shapiro_w  =  0.951234281063
skewness  =  -0.265521706974
slope_per10  =  -0.221371506094
slope_per90  =  0.315995618685
stetson_k  =  0.829913756603
weighted_mean  =  14.4718049896
weighted_std  =  0.160191188617
