-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.264374068965
cusum  =  0.11184482842
eta  =  0.633157096977
hl_amp_ratio  =  0.300713608402
kurtosis  =  -0.1600594393
n_points  =  270
period  =  0.612499318996
period_SNR  =  30.3358256738
period_log10FAP  =  -28.5079446395
period_uncertainty  =  0.000129137538736
phase_cusum  =  0.287975304468
phase_eta  =  0.260032663309
phi21  =  -2.18439973946
phi31  =  -4.32824359901
quartile31  =  0.345
r21  =  0.399739693732
r31  =  0.215330391007
shapiro_w  =  0.899204969406
skewness  =  -0.891233917469
slope_per10  =  -0.0987620957719
slope_per90  =  0.156387077977
stetson_k  =  0.677928001574
weighted_mean  =  16.1431219807
weighted_std  =  0.258554322682
