-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.324261723966
cusum  =  0.0814187985287
eta  =  0.52995101117
hl_amp_ratio  =  0.415905124001
kurtosis  =  -0.727108318564
n_points  =  360
period  =  0.64264121422
period_SNR  =  40.3139176201
period_log10FAP  =  -44.0727470598
period_uncertainty  =  0.000113540853972
phase_cusum  =  0.209813537662
phase_eta  =  0.0962337768723
phi21  =  1.00137455811
phi31  =  2.2519124477
quartile31  =  0.46
r21  =  0.564570779435
r31  =  0.368352952138
shapiro_w  =  0.911179721355
skewness  =  -0.680803400235
slope_per10  =  -0.186559553653
slope_per90  =  0.283149598121
stetson_k  =  0.760612850299
weighted_mean  =  13.6128604651
weighted_std  =  0.303166627098
