-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.227164213298
cusum  =  0.22468096741
eta  =  0.759624362099
hl_amp_ratio  =  1.6868597506
kurtosis  =  -1.10248838484
n_points  =  127
period  =  0.627899325616
period_SNR  =  13.8832221264
period_log10FAP  =  -10.0627155669
period_uncertainty  =  0.000126780054761
phase_cusum  =  0.329792990259
phase_eta  =  0.247416099305
phi21  =  0.922350962165
phi31  =  2.09328695551
quartile31  =  0.35
r21  =  0.356055021343
r31  =  0.473985589381
shapiro_w  =  0.949570417404
skewness  =  0.160711072883
slope_per10  =  -0.221229402968
slope_per90  =  0.249995342012
stetson_k  =  0.840326332368
weighted_mean  =  16.9182629668
weighted_std  =  0.187048145271
