-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.197199925799
cusum  =  0.141974414464
eta  =  0.701978383846
hl_amp_ratio  =  0.565299463725
kurtosis  =  -1.12890387343
n_points  =  345
period  =  0.767647096908
period_SNR  =  42.3822628942
period_log10FAP  =  -44.7037721877
period_uncertainty  =  0.000158696586538
phase_cusum  =  0.254991148991
phase_eta  =  0.287283391381
phi21  =  4.33266864044
phi31  =  5.69425768992
quartile31  =  0.33
r21  =  0.444383738543
r31  =  0.291827134474
shapiro_w  =  0.95205539465
skewness  =  -0.248625142655
slope_per10  =  -0.108244181402
slope_per90  =  0.147320726203
stetson_k  =  0.799826668185
weighted_mean  =  17.2301015305
weighted_std  =  0.191361166851
