-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.21897757599
cusum  =  0.118372171629
eta  =  1.2796184712
hl_amp_ratio  =  0.720577317097
kurtosis  =  -0.0203671617234
n_points  =  361
period  =  0.60544763059
period_SNR  =  29.317505061
period_log10FAP  =  -16.4985071133
period_uncertainty  =  0.000121951320361
phase_cusum  =  0.231881820787
phase_eta  =  1.3430828101
phi21  =  -2.18043977642
phi31  =  -4.46676110908
quartile31  =  0.42
r21  =  0.454873375416
r31  =  0.284811100468
shapiro_w  =  0.993352532387
skewness  =  -0.0775579019284
slope_per10  =  -0.0409658134167
slope_per90  =  0.0309109314994
stetson_k  =  0.767204362802
weighted_mean  =  19.0919957759
weighted_std  =  0.298856571975
