-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.349071796813
cusum  =  0.106838402863
eta  =  0.739411068191
hl_amp_ratio  =  0.555410617731
kurtosis  =  -0.327772530393
n_points  =  443
period  =  0.611456728015
period_SNR  =  30.7003367721
period_log10FAP  =  -44.8687173026
period_uncertainty  =  0.000153247309685
phase_cusum  =  0.189479851785
phase_eta  =  0.313480334176
phi21  =  -2.21987129936
phi31  =  -1.10656827029
quartile31  =  0.395
r21  =  0.553807099504
r31  =  0.344208130876
shapiro_w  =  0.957174897194
skewness  =  -0.554726900119
slope_per10  =  -0.0804101475085
slope_per90  =  0.0522210247442
stetson_k  =  0.761196323688
weighted_mean  =  16.0096997463
weighted_std  =  0.300633868347
