-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.320873686535
cusum  =  0.126211467785
eta  =  0.646834118512
hl_amp_ratio  =  0.344864890026
kurtosis  =  -0.806145242752
n_points  =  294
period  =  0.611283783233
period_SNR  =  40.3611761525
period_log10FAP  =  -37.1030541754
period_uncertainty  =  0.000128980969992
phase_cusum  =  0.245308205489
phase_eta  =  0.0350792950251
phi21  =  0.795183874089
phi31  =  1.93583200695
quartile31  =  0.4375
r21  =  0.48584484648
r31  =  0.353922492107
shapiro_w  =  0.880703747272
skewness  =  -0.738722162141
slope_per10  =  -0.190553184178
slope_per90  =  0.397070684755
stetson_k  =  0.753812095562
weighted_mean  =  13.7763923342
weighted_std  =  0.299083883424
