-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.362976639372
cusum  =  0.116298048933
eta  =  0.711186030865
hl_amp_ratio  =  0.772302123372
kurtosis  =  -0.94531311375
n_points  =  319
period  =  0.673495693341
period_SNR  =  42.986731412
period_log10FAP  =  -35.7609431091
period_uncertainty  =  0.000128578792842
phase_cusum  =  0.24686078913
phase_eta  =  0.282655926664
phi21  =  1.26765417804
phi31  =  2.3165792286
quartile31  =  0.54
r21  =  0.501287801661
r31  =  0.332563517031
shapiro_w  =  0.969062685966
skewness  =  -0.206012283578
slope_per10  =  -0.114863320048
slope_per90  =  0.125349425592
stetson_k  =  0.808173470041
weighted_mean  =  14.8681968784
weighted_std  =  0.307669108814
