<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.193036638448
cusum  =  0.126365158074
eta  =  0.511010982869
hl_amp_ratio  =  0.838845743276
kurtosis  =  -1.2743151255
n_points  =  357
period  =  0.583534773263
period_SNR  =  47.0779214787
period_log10FAP  =  -50.6127982754
period_uncertainty  =  9.56050180713e-05
phase_cusum  =  0.274611558946
phase_eta  =  0.215836688191
phi21  =  0.974677100414
phi31  =  2.44579195904
quartile31  =  0.31
r21  =  0.368521798504
r31  =  0.253432633783
shapiro_w  =  0.928012490273
skewness  =  -0.244638898841
slope_per10  =  -0.160788524842
slope_per90  =  0.243398130262
stetson_k  =  0.89480131297
weighted_mean  =  14.9809719691
weighted_std  =  0.170202208657
</pre></body></html>