<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.154658673734
cusum  =  0.100168239713
eta  =  0.581254887543
hl_amp_ratio  =  0.904428292544
kurtosis  =  -0.351604322904
n_points  =  378
period  =  0.634378719669
period_SNR  =  31.8815536764
period_log10FAP  =  -31.1769879103
period_uncertainty  =  0.000113176824922
phase_cusum  =  0.254229282649
phase_eta  =  0.947488579246
phi21  =  -1.91168649251
phi31  =  -3.57322120643
quartile31  =  0.24
r21  =  0.337195300394
r31  =  0.198819224366
shapiro_w  =  0.99288970232
skewness  =  -0.0612273204754
slope_per10  =  -0.0939999973135
slope_per90  =  0.077283055396
stetson_k  =  0.817698668135
weighted_mean  =  11.8279365079
weighted_std  =  0.158048536482
</pre></body></html>