-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.66


######### Lightcurve features #########

amplitude  =  0.237499014658
cusum  =  0.192467723427
eta  =  0.685989814934
hl_amp_ratio  =  0.449753965397
kurtosis  =  0.399520291765
n_points  =  72
period  =  0.12198890317
period_SNR  =  9.31342731165
period_log10FAP  =  -3.86348130093
period_uncertainty  =  3.17402534906e-06
phase_cusum  =  0.231919212985
phase_eta  =  0.680682578336
phi21  =  -0.667641013326
phi31  =  -0.386666007054
quartile31  =  0.255
r21  =  0.411989507511
r31  =  0.0751598143598
shapiro_w  =  0.927903711796
skewness  =  -0.836586389076
slope_per10  =  -0.059768442579
slope_per90  =  0.0728107636985
stetson_k  =  0.702376026846
weighted_mean  =  16.1692434518
weighted_std  =  0.218561092908
