-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.310161751918
cusum  =  0.100444638848
eta  =  0.607082110961
hl_amp_ratio  =  0.530768239753
kurtosis  =  -1.06555153872
n_points  =  356
period  =  0.618341972085
period_SNR  =  43.2691792237
period_log10FAP  =  -44.4769239129
period_uncertainty  =  0.00010733613213
phase_cusum  =  0.207874526413
phase_eta  =  0.288258413847
phi21  =  -2.22689996522
phi31  =  -4.17461390074
quartile31  =  0.51
r21  =  0.48381779499
r31  =  0.302464780327
shapiro_w  =  0.946574926376
skewness  =  -0.295613582499
slope_per10  =  -0.0969049435404
slope_per90  =  0.0930098816044
stetson_k  =  0.786356575813
weighted_mean  =  16.9816823311
weighted_std  =  0.291609636328
