<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.134277762333
cusum  =  0.116415186394
eta  =  0.559912516979
hl_amp_ratio  =  2.23887805375
kurtosis  =  -0.961103188496
n_points  =  396
period  =  0.186528566316
period_SNR  =  64.0615642464
period_log10FAP  =  -71.9853513096
period_uncertainty  =  9.64610009699e-06
phase_cusum  =  0.284437933153
phase_eta  =  0.130053155349
phi21  =  -0.0246300090708
phi31  =  0.163926641583
quartile31  =  0.18
r21  =  0.162823391808
r31  =  0.0370996164424
shapiro_w  =  0.919947147369
skewness  =  0.444811836079
slope_per10  =  -0.0751668271444
slope_per90  =  0.0705135161625
stetson_k  =  0.813543555127
weighted_mean  =  15.8452700089
weighted_std  =  0.0992271271973
</pre></body></html>