-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.328774642289
cusum  =  0.164700616853
eta  =  0.744200002958
hl_amp_ratio  =  0.578946775361
kurtosis  =  -0.903414946144
n_points  =  268
period  =  0.629146537556
period_SNR  =  37.8129051317
period_log10FAP  =  -29.0890464697
period_uncertainty  =  0.00017953815669
phase_cusum  =  0.253592320152
phase_eta  =  0.375333053573
phi21  =  -2.14444980158
phi31  =  -4.10782440105
quartile31  =  0.47
r21  =  0.490241473236
r31  =  0.283065139111
shapiro_w  =  0.952176451683
skewness  =  -0.377014773662
slope_per10  =  -0.124160038862
slope_per90  =  0.249493428909
stetson_k  =  0.813253327458
weighted_mean  =  13.5277466613
weighted_std  =  0.283133374636
