-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.255929208668
cusum  =  0.15417273184
eta  =  1.62734283654
hl_amp_ratio  =  1.0144324133
kurtosis  =  0.0168831609758
n_points  =  378
period  =  0.746917668351
period_SNR  =  39.6915306539
period_log10FAP  =  -19.400415227
period_uncertainty  =  0.000185600359762
phase_cusum  =  0.227845313615
phase_eta  =  1.45665036103
phi21  =  1.41095883489
phi31  =  0.707864312309
quartile31  =  0.43
r21  =  0.282304986651
r31  =  0.0431105972205
shapiro_w  =  0.993971884251
skewness  =  -0.0766752162074
slope_per10  =  -0.0449603241404
slope_per90  =  0.0319964686506
stetson_k  =  0.781921226649
weighted_mean  =  18.7703921188
weighted_std  =  0.313329752828
