<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.446593951033
cusum  =  0.15254479149
eta  =  0.619908436468
hl_amp_ratio  =  0.302308679481
kurtosis  =  -0.821900943679
n_points  =  322
period  =  0.592072202457
period_SNR  =  46.2273193038
period_log10FAP  =  -38.1392581039
period_uncertainty  =  9.93543124016e-05
phase_cusum  =  0.253322545321
phase_eta  =  0.531935056447
phi21  =  0.891276351453
phi31  =  -0.992519916689
quartile31  =  0.63
r21  =  0.339941937717
r31  =  0.147103697676
shapiro_w  =  0.917780458927
skewness  =  -0.549349987841
slope_per10  =  -0.0921038286041
slope_per90  =  0.160152990539
stetson_k  =  0.745602433052
weighted_mean  =  12.2991123824
weighted_std  =  0.402835578038
</pre></body></html>