-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.271403392976
cusum  =  0.107136282564
eta  =  0.607403943553
hl_amp_ratio  =  0.568988904093
kurtosis  =  -1.02262741537
n_points  =  288
period  =  0.63793276057
period_SNR  =  36.7528186796
period_log10FAP  =  -36.1936591096
period_uncertainty  =  0.000117051886457
phase_cusum  =  0.234811271949
phase_eta  =  0.329055267511
phi21  =  -2.27266108784
phi31  =  -3.56680007437
quartile31  =  0.425
r21  =  0.40028491993
r31  =  0.165011523012
shapiro_w  =  0.942513406277
skewness  =  -0.395846864741
slope_per10  =  -0.19762158934
slope_per90  =  0.293391568795
stetson_k  =  0.820068584257
weighted_mean  =  14.0462039489
weighted_std  =  0.244855329043
