-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.221279295395
cusum  =  0.183962583119
eta  =  1.05276721054
hl_amp_ratio  =  0.691913936128
kurtosis  =  -0.20592034917
n_points  =  281
period  =  0.601346645057
period_SNR  =  30.3067328091
period_log10FAP  =  -20.603221365
period_uncertainty  =  0.000162460269134
phase_cusum  =  0.214266463703
phase_eta  =  0.93150657957
phi21  =  -1.97593100551
phi31  =  -0.675905710811
quartile31  =  0.34
r21  =  0.366488130918
r31  =  0.130499646553
shapiro_w  =  0.986609339714
skewness  =  -0.328301737541
slope_per10  =  -0.0490434387036
slope_per90  =  0.100924153108
stetson_k  =  0.772136644799
weighted_mean  =  18.414611601
weighted_std  =  0.241328346566
