-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.331752344153
cusum  =  0.262031016979
eta  =  1.5115591403
hl_amp_ratio  =  1.08151427004
kurtosis  =  -0.241156782449
n_points  =  306
period  =  0.566248628571
period_SNR  =  30.8547914237
period_log10FAP  =  -16.9361780983
period_uncertainty  =  0.000106671644961
phase_cusum  =  0.394968222295
phase_eta  =  1.2255322717
phi21  =  -2.53329694533
phi31  =  -4.01134208736
quartile31  =  0.56
r21  =  0.508144947054
r31  =  0.281442558456
shapiro_w  =  0.989652335644
skewness  =  0.196466327779
slope_per10  =  -0.0285136407009
slope_per90  =  0.0389443375917
stetson_k  =  0.775512822823
weighted_mean  =  19.5072741755
weighted_std  =  0.389191920441
