-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.259994364762
cusum  =  0.139163020364
eta  =  1.50031059078
hl_amp_ratio  =  1.00048616035
kurtosis  =  0.265580527351
n_points  =  341
period  =  0.5722511537
period_SNR  =  29.2535364029
period_log10FAP  =  -14.9295803239
period_uncertainty  =  0.000108944886618
phase_cusum  =  0.248761995722
phase_eta  =  1.3851575115
phi21  =  -2.36250814343
phi31  =  -1.27782918374
quartile31  =  0.4
r21  =  0.47905657557
r31  =  0.341563080207
shapiro_w  =  0.989169836044
skewness  =  0.336403569722
slope_per10  =  -0.0385520543328
slope_per90  =  0.0344747560518
stetson_k  =  0.791427368214
weighted_mean  =  19.3457593588
weighted_std  =  0.30394640985
